%layout

\topmargin 0in
\textheight 8in
\textwidth 6.5in
\oddsidemargin 0in
\evensidemargin 0in

%packages

\usepackage{amsmath}
\usepackage{amssymb}
\usepackage{amsthm}
\usepackage{array}
\usepackage{color}
%\usepackage{epsfig}
%\usepackage{float} % ?
\usepackage[pdftex]{graphicx}
\usepackage{latexsym}
%\usepackage{multicol} % ?
%\usepackage{multirow} % ?
\usepackage{pifont}
\usepackage{fancyhdr}
\pagestyle{fancy}
\headheight 88pt
\headsep 0.25in
\pdfpagewidth 8.5in
\pdfpageheight 11in
%counters
\cfoot{}

%commands

\newcommand\hbump{\hskip0.2in}

\newcommand{\USprob}[2]{\noindent {\hskip-0.25in\bf #1} #2 }

